% Reduzierte Papier Größe 6.7*1cm
  \setlength{\paperwidth}{6.7cm} 
  \setlength{\paperheight}{1cm}
  \hoffset-81pt
  \voffset-70pt
  \oddsidemargin=0pt
  \topmargin=0pt
  \headheight=0pt
  \headsep = 0pt
% \fontfamily{phv}\selectfont\tiny	% Helvetica Font
% \fontfamily{phv}\selectfont\footnotesize{	% Helvetica Font
\xdefinecolor{ohmblue}{rgb}{0,.33,.98}  % Logo Farbe
\begin{tikzpicture}[scale=.33]
\filldraw[ohmblue](0,0)--(0,.65)--(.45,.65)--(0,1.15)--(0,2.55)--(2.55,2.55)--(2.55,1.15)
--(2.1,.65)--(2.55,.65)--(2.55,0)--(1.4,0)--(1.4,2)--(1.17,2)--(1.17,0)--(0,0);
\draw node at(2.7,1.2)[right]{\fontfamily{phv}\fontseries{b}\fontshape{n}\selectfont\tiny\textbf{TECHNISCHE HOCHSCHULE NÜRNBERG}};
\draw node at(2.7,.38)[right]{\fontfamily{phv}\fontseries{m}\fontshape{n}\selectfont\tiny {GEORG SIMON OHM}};
\end{tikzpicture}
