\begin{thebibliography}{10}

\bibitem{HARRIEHAUSEN.2020b}
THOMAS HARRIEHAUSEN and Dieter Schwarzenau.
\newblock {\em Moeller Grundlagen der Elektrotechnik}.
\newblock {Springer Fachmedien Wiesbaden}, Wiesbaden, 24., durchges. u. korrig.
  auflage 2020 edition, 2020.

\bibitem{Albach.2014}
Manfred Albach.
\newblock {\em Elektrotechnik}.
\newblock Always learning. Pearson, M{\"u}nchen, 3. dr edition, 2014.

\bibitem{Franz.2014}
Alfred~M. Franz, Tam{\'a}s Haidegger, Wolfgang Birkfellner, Kevin Cleary,
  Terry~M. Peters, and Lena Maier-Hein.
\newblock Electromagnetic tracking in medicine--a review of technology,
  validation, and applications.
\newblock {\em IEEE transactions on medical imaging}, 33(8):1702--1725, 2014.

\bibitem{.2019}
{\em 2019 International Conference on Indoor Positioning and Indoor Navigation:
  30 September-3 October 2019, Pisa, Italy}.
\newblock IEEE, [Piscataway, NJ], 2019.

\bibitem{Rey.2006}
J.~F. Rey, S.~Ladas, A.~Alhassani, and K.~Kuznetsov.
\newblock European society of gastrointestinal endoscopy (esge). video capsule
  endoscopy: update to guidelines (may 2006).
\newblock {\em Endoscopy}, 38(10):1047--1053, 2006.

\bibitem{Than.2012}
Trung~Duc Than, Gursel Alici, Hao Zhou, and Weihua Li.
\newblock A review of localization systems for robotic endoscopic capsules.
\newblock {\em IEEE transactions on bio-medical engineering}, 59(9):2387--2399,
  2012.

\bibitem{Raabe.2002}
Andreas Raabe, Ren{\'e} Krishnan, Robert Wolff, Elvis Hermann, Michael
  Zimmermann, and Volker Seifert.
\newblock Laser surface scanning for patient registration in intracranial
  image-guided surgery.
\newblock {\em Neurosurgery}, 50(4):797--801; discussion 802--3, 2002.

\bibitem{Yin.2013}
Minjie Yin, Xukun Shen, Yong Hu, and Xiaorui Fang.
\newblock An automatic registration method based on fiducial marker for image
  guided neurosurgery system.
\newblock In Gary Tan, Gee~Kin Yeo, Stephen~John Turner, and Yong~Meng Teo,
  editors, {\em AsiaSim 2013}, volume 402 of {\em Communications in Computer
  and Information Science}, pages 114--125. {Springer Berlin Heidelberg},
  Berlin, Heidelberg, 2013.

\bibitem{Schulz.2012}
Chris Schulz, Stephan Waldeck, and Uwe~Max Mauer.
\newblock Intraoperative image guidance in neurosurgery: development, current
  indications, and future trends.
\newblock {\em Radiology research and practice}, 2012:197364, 2012.

\bibitem{Orringer.2012}
Daniel~A. Orringer, Alexandra Golby, and Ferenc Jolesz.
\newblock Neuronavigation in the surgical management of brain tumors: current
  and future trends.
\newblock {\em Expert review of medical devices}, 9(5):491--500, 2012.

\bibitem{Stieglitz.2013}
Lennart~Henning Stieglitz, Jens Fichtner, Robert Andres, Philippe Schucht,
  Ann-Kathrin Kr{\"a}henb{\"u}hl, Andreas Raabe, and J{\"u}rgen Beck.
\newblock The silent loss of neuronavigation accuracy: a systematic
  retrospective analysis of factors influencing the mismatch of frameless
  stereotactic systems in cranial neurosurgery.
\newblock {\em Neurosurgery}, 72(5):796--807, 2013.

\bibitem{Cleary.2010}
Kevin Cleary and Terry~M. Peters.
\newblock Image-guided interventions: technology review and clinical
  applications.
\newblock {\em Annual review of biomedical engineering}, 12:119--142, 2010.

\bibitem{Putzer.2016}
D.~Putzer, D.~Arco, B.~Schamberger, F.~Schanda, J.~Mahlknecht, G.~Widmann,
  P.~Schullian, W.~Jaschke, and R.~Bale.
\newblock Elektromagnetische navigationssysteme im vergleich: Ct-gezielte
  punktionen an einem phantom.
\newblock {\em RoFo : Fortschritte auf dem Gebiete der Rontgenstrahlen und der
  Nuklearmedizin}, 188(5):470--478, 2016.

\bibitem{McMillen.2010}
Jason~L. McMillen, Marianne Vonau, and Martin~J. Wood.
\newblock Pinless frameless electromagnetic image-guided neuroendoscopy in
  children.
\newblock {\em Child's nervous system : ChNS : official journal of the
  International Society for Pediatric Neurosurgery}, 26(7):871--878, 2010.

\bibitem{Hermann.2012}
Elvis~J. Hermann, Hans-Holger Capelle, Christoph~A. Tschan, and Joachim~K.
  Krauss.
\newblock Electromagnetic-guided neuronavigation for safe placement of
  intraventricular catheters in pediatric neurosurgery.
\newblock {\em Journal of neurosurgery. Pediatrics}, 10(4):327--333, 2012.

\bibitem{Weiner.2015}
Gregory~M. Weiner, Srinivas Chivukula, Ching-Jen Chen, Dale Ding, Johnathan~A.
  Engh, and Nduka Amankulor.
\newblock Ommaya reservoir with ventricular catheter placement for chemotherapy
  with frameless and pinless electromagnetic surgical neuronavigation.
\newblock {\em Clinical neurology and neurosurgery}, 130:61--66, 2015.

\bibitem{Hayhurst.2009}
Caroline Hayhurst, Patricia Byrne, Paul~R. Eldridge, and Conor~L. Mallucci.
\newblock Application of electromagnetic technology to neuronavigation: a
  revolution in image-guided neurosurgery.
\newblock {\em Journal of neurosurgery}, 111(6):1179--1184, 2009.

\bibitem{Kuth.772006}
Rainer Kuth, Johannes Reinschke, and Rudolf Rockelein.
\newblock Method for determining the position and orientation of an endoscopy
  capsule guided through an examination object by using a navigating magnetic
  field generated by means of a navigation device, 2007.

\bibitem{Wilding.2000}
Ian Wilding, Peter Hirst, and Alyson Connor.
\newblock Development of a new engineering-based capsule for human drug
  absorption studies.
\newblock {\em Pharmaceutical Science {\&} Technology Today}, 3(11):385--392,
  2000.

\bibitem{Dumoulin.1993}
C.~L. Dumoulin, S.~P. Souza, and R.~D. Darrow.
\newblock Real-time position monitoring of invasive devices using magnetic
  resonance.
\newblock {\em Magnetic resonance in medicine}, 29(3):411--415, 1993.

\bibitem{Krieger.2005}
Axel Krieger, Robert~C. Susil, Cynthia M{\'e}nard, Jonathan~A. Coleman, Gabor
  Fichtinger, Ergin Atalar, and Louis~L. Whitcomb.
\newblock Design of a novel mri compatible manipulator for image guided
  prostate interventions.
\newblock {\em IEEE transactions on bio-medical engineering}, 52(2):306--313,
  2005.

\bibitem{Fluckiger.2007}
Michael Fl{\"u}ckiger and Bradley~J. Nelson.
\newblock Ultrasound emitter localization in heterogeneous media.
\newblock {\em Annual International Conference of the IEEE Engineering in
  Medicine and Biology Society. IEEE Engineering in Medicine and Biology
  Society. Annual International Conference}, 2007:2867--2870, 2007.

\bibitem{Nagy.12.05.200917.05.2009}
Z.~Nagy, M.~Fluckiger, O.~Ergeneman, S.~Pane, M.~Probst, and B.~J. Nelson.
\newblock A wireless acoustic emitter for passive localization in liquids.
\newblock In {\em 2009 IEEE International Conference on Robotics and
  Automation}, pages 2593--2598. IEEE, 12.05.2009 - 17.05.2009.

\bibitem{Ibrahim.30.09.201903.10.2019}
Ibrahim Ibrahim, Kai Rieger, Tobias Draeger, and Rafael Psiuk.
\newblock Adaptive algorithm for estimating the position of a passive object in
  a picking shelf.
\newblock In {\em 2019 International Conference on Indoor Positioning and
  Indoor Navigation (IPIN)}, pages 1--5. IEEE, 30.09.2019 - 03.10.2019.

\bibitem{Mateen.2017}
Haris Mateen, Rubel Basar, Afaz~Uddin Ahmed, and Mohd~Yazed Ahmad.
\newblock Localization of wireless capsule endoscope: A systematic review.
\newblock {\em IEEE Sensors Journal}, 17(5):1197--1206, 2017.

\end{thebibliography}
